\hypertarget{dc__clock_8f90}{}\section{dc\+\_\+utils/dc\+\_\+clock.f90 File Reference}
\label{dc__clock_8f90}\index{dc\+\_\+utils/dc\+\_\+clock.\+f90@{dc\+\_\+utils/dc\+\_\+clock.\+f90}}
\subsection*{Data Types}
\begin{DoxyCompactItemize}
\item 
type \hyperlink{structdc__clock_1_1clock}{dc\+\_\+clock\+::clock}
\item 
interface \hyperlink{interfacedc__clock_1_1dcclockcreate}{dc\+\_\+clock\+::dcclockcreate}
\item 
interface \hyperlink{interfacedc__clock_1_1dcclockclose}{dc\+\_\+clock\+::dcclockclose}
\item 
interface \hyperlink{interfacedc__clock_1_1dcclockstart}{dc\+\_\+clock\+::dcclockstart}
\item 
interface \hyperlink{interfacedc__clock_1_1dcclockstop}{dc\+\_\+clock\+::dcclockstop}
\item 
interface \hyperlink{interfacedc__clock_1_1dcclockputline}{dc\+\_\+clock\+::dcclockputline}
\item 
interface \hyperlink{interfacedc__clock_1_1dcclockget}{dc\+\_\+clock\+::dcclockget}
\item 
interface \hyperlink{interfacedc__clock_1_1dcclockevalsec}{dc\+\_\+clock\+::dcclockevalsec}
\item 
interface \hyperlink{interfacedc__clock_1_1dcclocktochar}{dc\+\_\+clock\+::dcclocktochar}
\item 
interface \hyperlink{interfacedc__clock_1_1dcclockresult}{dc\+\_\+clock\+::dcclockresult}
\item 
interface \hyperlink{interfacedc__clock_1_1operator_07_09_08}{dc\+\_\+clock\+::operator(+)}
\item 
interface \hyperlink{interfacedc__clock_1_1operator_07-_08}{dc\+\_\+clock\+::operator(-\/)}
\item 
interface \hyperlink{interfacedc__clock_1_1dcclocksetname}{dc\+\_\+clock\+::dcclocksetname}
\item 
interface \hyperlink{interfacedc__clock_1_1dcclockpredict}{dc\+\_\+clock\+::dcclockpredict}
\item 
interface \hyperlink{interfacedc__clock_1_1create}{dc\+\_\+clock\+::create}
\item 
interface \hyperlink{interfacedc__clock_1_1close}{dc\+\_\+clock\+::close}
\item 
interface \hyperlink{interfacedc__clock_1_1start}{dc\+\_\+clock\+::start}
\item 
interface \hyperlink{interfacedc__clock_1_1stop}{dc\+\_\+clock\+::stop}
\item 
interface \hyperlink{interfacedc__clock_1_1putline}{dc\+\_\+clock\+::putline}
\item 
interface \hyperlink{interfacedc__clock_1_1get}{dc\+\_\+clock\+::get}
\item 
interface \hyperlink{interfacedc__clock_1_1evalsec}{dc\+\_\+clock\+::evalsec}
\item 
interface \hyperlink{interfacedc__clock_1_1tochar}{dc\+\_\+clock\+::tochar}
\item 
interface \hyperlink{interfacedc__clock_1_1result}{dc\+\_\+clock\+::result}
\item 
interface \hyperlink{interfacedc__clock_1_1set__name}{dc\+\_\+clock\+::set\+\_\+name}
\item 
interface \hyperlink{interfacedc__clock_1_1predict}{dc\+\_\+clock\+::predict}
\end{DoxyCompactItemize}
\subsection*{Modules}
\begin{DoxyCompactItemize}
\item 
module \hyperlink{namespacedc__clock}{dc\+\_\+clock}
\end{DoxyCompactItemize}
\subsection*{Functions/\+Subroutines}
\begin{DoxyCompactItemize}
\item 
subroutine \hyperlink{namespacedc__clock_a07a8f98e376ed61d3163f567ffda6959}{dc\+\_\+clock\+::dcclockcreate0} (clk, name)
\item 
subroutine \hyperlink{namespacedc__clock_a57f4efe72b32447000034bbe8326871f}{dc\+\_\+clock\+::dcclockclose0} (clk)
\item 
subroutine \hyperlink{namespacedc__clock_aafd8984f9e7c2f0153867e43f8df9f82}{dc\+\_\+clock\+::dcclockstart0} (clk, err)
\item 
subroutine \hyperlink{namespacedc__clock_a60f2a9438e84c38d0783279e38e62e14}{dc\+\_\+clock\+::dcclockstop0} (clk, err)
\item 
subroutine \hyperlink{namespacedc__clock_a76f8a30e34496c3a8ee008a55c7a2015}{dc\+\_\+clock\+::dcclockgetr} (clk, sec, err)
\item 
subroutine \hyperlink{namespacedc__clock_a2b25de3afef99974f15103122dd43db7}{dc\+\_\+clock\+::dcclockgetd} (clk, sec, err)
\item 
real(dp) function \hyperlink{namespacedc__clock_ae7e6304adc3352b2eaada6516b6ac531}{dc\+\_\+clock\+::dcclockevalsecd} (clk)
\item 
character(string) function \hyperlink{namespacedc__clock_ac94f9e94810fe6613f6eabdbed50f906}{dc\+\_\+clock\+::dcclocktochar0} (clk)
\item 
subroutine \hyperlink{namespacedc__clock_a829d23e333adb1fcb0717072216226dc}{dc\+\_\+clock\+::dcclockputline0} (clk, unit, indent, err)
\item 
subroutine \hyperlink{namespacedc__clock_a7cd2f4ecf695d8a7243a74cc62b7d93e}{dc\+\_\+clock\+::dcclockresult0} (clks, unit, total\+\_\+auto, clk\+\_\+total, total\+\_\+name, err)
\item 
character(token) function \hyperlink{namespacedc__clock_afa39cad42a3d42e1373bfec39a1211f9}{dc\+\_\+clock\+::result\+\_\+value\+\_\+form} (value)
\item 
character(token) function \hyperlink{namespacedc__clock_a34945d1c02e19d9e77643f263c4afc4f}{dc\+\_\+clock\+::fit\+\_\+unit\+\_\+value} (sec, diff)
\item 
character(token) function \hyperlink{namespacedc__clock_a1cdd8cc0cc556d4981290a2943de71ec}{dc\+\_\+clock\+::printf\+\_\+g5\+\_\+2} (value)
\item 
type(clock) function \hyperlink{namespacedc__clock_a0b0480ee9724e766f1c6e05c4a40a40f}{dc\+\_\+clock\+::dcclockadd} (clk1, clk2)
\item 
type(clock) function \hyperlink{namespacedc__clock_aab57a5168d80ff1a0f4c4da0490e5eeb}{dc\+\_\+clock\+::dcclocksubtract} (clk1, clk2)
\item 
subroutine \hyperlink{namespacedc__clock_aa6ebe4695ac2137a6d169297879fb0dd}{dc\+\_\+clock\+::dcclocksetname0} (clk, name, err)
\item 
subroutine \hyperlink{namespacedc__clock_ac5b2cb462d1de6b4e165731785683bfc}{dc\+\_\+clock\+::dcclockpredict0} (clk, progress, unit, err)
\end{DoxyCompactItemize}
\subsection*{Variables}
\begin{DoxyCompactItemize}
\item 
character($\ast$), parameter \hyperlink{namespacedc__clock_a297abf1194fb391e92a61db069caa623}{dc\+\_\+clock\+::version} = \textquotesingle{}\$Name\+: \$\textquotesingle{} // \textquotesingle{}\$Id\+: dc\+\_\+clock.\+F90,v 1.\+1 2009-\/03-\/20 09\+:09\+:53 morikawa Exp \$\textquotesingle{}
\end{DoxyCompactItemize}
