\hypertarget{hsp2d_8f90}{}\section{gtool/gtool\+\_\+history/hsp2d.f90 File Reference}
\label{hsp2d_8f90}\index{gtool/gtool\+\_\+history/hsp2d.\+f90@{gtool/gtool\+\_\+history/hsp2d.\+f90}}
\subsection*{Functions/\+Subroutines}
\begin{DoxyCompactItemize}
\item 
subroutine \hyperlink{hsp2d_8f90_a9caa83f03227f31da841352102b7bd85}{hsp2d} (vname, var, i, j)
\end{DoxyCompactItemize}


\subsection{Function/\+Subroutine Documentation}
\mbox{\Hypertarget{hsp2d_8f90_a9caa83f03227f31da841352102b7bd85}\label{hsp2d_8f90_a9caa83f03227f31da841352102b7bd85}} 
\index{hsp2d.\+f90@{hsp2d.\+f90}!hsp2d@{hsp2d}}
\index{hsp2d@{hsp2d}!hsp2d.\+f90@{hsp2d.\+f90}}
\subsubsection{\texorpdfstring{hsp2d()}{hsp2d()}}
{\footnotesize\ttfamily subroutine hsp2d (\begin{DoxyParamCaption}\item[{character(len=$\ast$)}]{vname,  }\item[{double precision, dimension(i,j)}]{var,  }\item[{integer}]{i,  }\item[{integer}]{j }\end{DoxyParamCaption})}



Definition at line 15 of file hsp2d.\+f90.


\begin{DoxyCode}
15   \textcolor{comment}{!}
16   \textcolor{comment}{!== 機能}
17   \textcolor{comment}{!}
18   \textcolor{comment}{! ヒストリーに変数を出力する}
19   \textcolor{comment}{!}
20 
21   \textcolor{keywordtype}{use }\hyperlink{namespacegtool__history}{gtool\_history}
22   \textcolor{keywordtype}{character(len=*)} :: vname \textcolor{comment}{! 変数名}
23   \textcolor{keywordtype}{double precision} :: var(i,j) \textcolor{comment}{! 変数}
24   \textcolor{keywordtype}{integer}          :: i,j \textcolor{comment}{! 各次元の大きさ}
25 
26   \textcolor{keyword}{call }\hyperlink{interfacegtool__history__generic_1_1historyput}{historyput}(vname,var)
27 
\end{DoxyCode}
