\hypertarget{interfacedc__clock_1_1close}{}\section{dc\+\_\+clock\+:\+:close Interface Reference}
\label{interfacedc__clock_1_1close}\index{dc\+\_\+clock\+::close@{dc\+\_\+clock\+::close}}
\subsection*{Private Member Functions}
\begin{DoxyCompactItemize}
\item 
subroutine \hyperlink{interfacedc__clock_1_1close_a873292e0a77fc757059336f2b23ab3df}{dcclockclose0} (clk)
\end{DoxyCompactItemize}


\subsection{Detailed Description}


Definition at line 180 of file dc\+\_\+clock.\+f90.



\subsection{Member Function/\+Subroutine Documentation}
\mbox{\Hypertarget{interfacedc__clock_1_1close_a873292e0a77fc757059336f2b23ab3df}\label{interfacedc__clock_1_1close_a873292e0a77fc757059336f2b23ab3df}} 
\index{dc\+\_\+clock\+::close@{dc\+\_\+clock\+::close}!dcclockclose0@{dcclockclose0}}
\index{dcclockclose0@{dcclockclose0}!dc\+\_\+clock\+::close@{dc\+\_\+clock\+::close}}
\subsubsection{\texorpdfstring{dcclockclose0()}{dcclockclose0()}}
{\footnotesize\ttfamily subroutine dc\+\_\+clock\+::close\+::dcclockclose0 (\begin{DoxyParamCaption}\item[{type(\hyperlink{structdc__clock_1_1clock}{clock}), intent(inout)}]{clk }\end{DoxyParamCaption})\hspace{0.3cm}{\ttfamily [private]}}



Definition at line 245 of file dc\+\_\+clock.\+f90.


\begin{DoxyCode}
245     \textcolor{comment}{!}
246     \textcolor{comment}{!=== CLOCK の終了サブルーチン}
247     \textcolor{comment}{!}
248     \textcolor{comment}{! CLOCK 型の変数をクローズします.}
249     \textcolor{comment}{!}
250     \textcolor{keywordtype}{implicit none}
251     \textcolor{keywordtype}{type}(clock), \textcolor{keywordtype}{intent(inout)}:: clk
252     \textcolor{keywordtype}{character(*)}, \textcolor{keywordtype}{parameter}:: subname = \textcolor{stringliteral}{'DCClockClose'}
253   \textcolor{keywordflow}{continue}
254     \textcolor{keyword}{call }beginsub(subname)
255     \textcolor{keywordflow}{if} (clk % initialized) \textcolor{keywordflow}{then}
256       clk % initialized = .false.
257       clk % name = \textcolor{stringliteral}{''}
258 \textcolor{keywordflow}{    end if}
259     \textcolor{keyword}{call }endsub(subname)
\end{DoxyCode}


The documentation for this interface was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
dc\+\_\+utils/\hyperlink{dc__clock_8f90}{dc\+\_\+clock.\+f90}\end{DoxyCompactItemize}
