\hypertarget{interfacedc__clock_1_1dcclockevalsec}{}\section{dc\+\_\+clock\+:\+:dcclockevalsec Interface Reference}
\label{interfacedc__clock_1_1dcclockevalsec}\index{dc\+\_\+clock\+::dcclockevalsec@{dc\+\_\+clock\+::dcclockevalsec}}
\subsection*{Private Member Functions}
\begin{DoxyCompactItemize}
\item 
real(dp) function \hyperlink{interfacedc__clock_1_1dcclockevalsec_a59183ee4cc74e562461da9a9fa3ffa9a}{dcclockevalsecd} (clk)
\end{DoxyCompactItemize}


\subsection{Detailed Description}


Definition at line 153 of file dc\+\_\+clock.\+f90.



\subsection{Member Function/\+Subroutine Documentation}
\mbox{\Hypertarget{interfacedc__clock_1_1dcclockevalsec_a59183ee4cc74e562461da9a9fa3ffa9a}\label{interfacedc__clock_1_1dcclockevalsec_a59183ee4cc74e562461da9a9fa3ffa9a}} 
\index{dc\+\_\+clock\+::dcclockevalsec@{dc\+\_\+clock\+::dcclockevalsec}!dcclockevalsecd@{dcclockevalsecd}}
\index{dcclockevalsecd@{dcclockevalsecd}!dc\+\_\+clock\+::dcclockevalsec@{dc\+\_\+clock\+::dcclockevalsec}}
\subsubsection{\texorpdfstring{dcclockevalsecd()}{dcclockevalsecd()}}
{\footnotesize\ttfamily real(dp) function dc\+\_\+clock\+::dcclockevalsec\+::dcclockevalsecd (\begin{DoxyParamCaption}\item[{type(\hyperlink{structdc__clock_1_1clock}{clock}), intent(in)}]{clk }\end{DoxyParamCaption})\hspace{0.3cm}{\ttfamily [private]}}



Definition at line 425 of file dc\+\_\+clock.\+f90.


\begin{DoxyCode}
425     \textcolor{comment}{!}
426     \textcolor{comment}{!=== CPU 時間 (単位: 秒) の取得}
427     \textcolor{comment}{!}
428     \textcolor{comment}{! CPU 時間 (単位: 秒) を返します.}
429     \textcolor{comment}{!}
430     \textcolor{comment}{! 第一引数 *clk* に対して DCClockCreate }
431     \textcolor{comment}{! による初期化が行われていない場合, -1.0 が返ります.}
432     \textcolor{comment}{!}
433     \textcolor{keywordtype}{use }\hyperlink{namespacedc__types}{dc\_types}\textcolor{keywordtype}{, only}: \hyperlink{namespacedc__types_ac74a34430fcd3d0eb2344f19d536c086}{dp}
434     \textcolor{keywordtype}{implicit none}
435     \textcolor{keywordtype}{type}(clock), \textcolor{keywordtype}{intent(in)}:: clk
436     \textcolor{keywordtype}{real(DP)}:: result
437     \textcolor{keywordtype}{logical}:: err
438   \textcolor{keywordflow}{continue}
439     \textcolor{keyword}{call }dcclockgetd(clk, result, err)
440     \textcolor{keywordflow}{if} (err) result = -1.0\_dp
\end{DoxyCode}


The documentation for this interface was generated from the following file\+:\begin{DoxyCompactItemize}
\item 
dc\+\_\+utils/\hyperlink{dc__clock_8f90}{dc\+\_\+clock.\+f90}\end{DoxyCompactItemize}
