%#!platex thesis.tex
%
%= 卒業論文・修士論文等のサンプルファイル - メインファイル
%
%== 解説
%
%  このファイルでは以下のファイルの読み込みを行う.
%
%  ・ 表題 - 著作者名 - 所属 - 今卒業論文提出日時 等のページ
%     (これに関しては, 読み込むのではなく, このファイルで生成する)
%
%  ・ 要旨
%
%  ・ 目次 (これに関しては, 読み込むのではなく, このファイルで作成する)
%
%  ・ 本文
%  ・ 謝辞
%
%  ・ 原著巻末の数学公式ページ
%  ・ 今卒業論文の参考文献
%
%== フォーマットの作成履歴
%
% 2003/01/12 森川 靖大   作成
% 2004/08/25 森川 靖大   下記の Sample に追記
% 2005/01/12 森川 靖大   脚注の表記を微妙に変更
% 2005/01/12 森川 靖大   要旨のファイル名を変更
% 2005/12/27 森川 靖大   documentclass を jarticle に変更
%                        その他細かい修正.
% 2006/01/03 森川 靖大   \Dparindent などが再設定される部分を修正.
%
%== 履歴
%
% 200?/??/?? ???? ????   作成
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%             Style  Setting             %%%%%%%%
\documentclass[a4j,12pt,openbib,titlepage]{jarticle}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%             Package Include            %%%%%%%%
\usepackage{Dennou6}
\usepackage{ascmac}
\usepackage{tabularx}
\usepackage{graphicx}
\usepackage{amssymb}
\usepackage{amsmath}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%            PageStyle Setting           %%%%%%%%
%\pagestyle{DAmyheadings}
\pagestyle{DAheadings}


%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%        Title and Auther Setting        %%%%%%%%

%% 表題作成用に, 少々凝ってみる %%

\Dtitle[気象力学]{
\Huge
数値予報モデルのための気象力学\\
Dynamic Meteorology for Numerical Prediction Model
}

%  サンプル
%\Dtitle[各ページの左上に出るタイトル]{
%\Huge
%表題のページに表示される日本語タイトル\\
% 英表題
%}

\Dauthor[森川 靖大]{
\LARGE
森川 靖大\\
Morikawa Yasuhiro\\
\\
\Large
北海道大学大学院理学研究科 地球惑星科学専攻\\
\Large
地球流体力学研究室\\
\large
Division of Earth and Planetary Sciences,\\
\large
Graduate School of Science, Hokkaido University.\\
\large
Geophysical Fluid Dynamics Laboratory.
}

%  サンプル
%\Dauthor[各ページの左下に出る著者名]{
%\LARGE
%表題に表示される日本語指名\\
%表題に表示される英語指名\\
%\\
%\LARGE
%所属 (日本語)\\
%\LARGE
%所属 (英語)
%}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%   Set Counter (chapter, section etc. ) %%%%%%%%
%\setcounter{chapter}{0}
\setcounter{section}{0}
\setcounter{equation}{0}
\setcounter{page}{1}
\setcounter{figure}{0}
\setcounter{footnote}{0}


%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%        Counter Output Format           %%%%%%%%
\def\thesubsection{\arabic{section}-\arabic{subsection}}
\def\thesubsubsection{\arabic{section}-\arabic{subsection}-\arabic{subsubsection}}
\def\thepage{\arabic{page}}
\def\thefootnote{$\dagger$\arabic{footnote}}
%
% 式, 図, 表番号を節番号に関係なく 1, 2, 3, ... とする場合
\def\theequation{\arabic{equation}}
\def\thefigure{\arabic{figure}}
\def\thetable{\arabic{table}}
%
% 式, 図, 表番号に節番号を付け, 1-1, 1-2, 1-3, ... とする場合
%\def\theequation{\arabic{section}-\arabic{equation}}
%\def\thefigure{\arabic{section}-\arabic{figure}}
%\def\thetable{\arabic{section}-\arabic{table}}


%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%   Subtitle, Date, Filename Setting     %%%%%%%%
%\Dchapter{}
%\markright{}
\Ddate{2006/01/27}  % これは提出日 (表題のページに利用される)
%\Dfile{}


%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%        Dennou-Style Definition         %%%%%%%%
\Dparskip           % 段落間に空行をいれる
%\Dnoparskip        % 段落間に空行をいれない
\Dparindent         % 段落の始めで 1 文字分インデントする
%\Dnoparindent      % 段落の始めで 1 文字分インデントしない

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%            Local Definition            %%%%%%%%
\def\dfrac#1#2{{\displaystyle\frac{#1}{#2}}}
\def\sfrac#1#2{{^{#1}\!/_{#2}}}
\def\sech{\,{\textrm{sech}}\,}

\def\Dfootlab#1{\Dlabel{footnote:#1}}
\def\Dfootref#1{\DselJ{脚注}{footnote}\ref{footnote:#1}}
\def\Dseclab#1{\Dlabel{section:#1}}
\def\Dsecref#1{\ref{section:#1}}
\def\Dsubseclab#1{\Dlabel{subsection:#1}}
\def\Dsubsecref#1{\ref{subsection:#1}}
\def\Dsubsubseclab#1{\Dlabel{subsubsection:#1}}
\def\Dsubsubsecref#1{\ref{subsubsection:#1}}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%          include load limit            %%%%%%%%
%
% 特定のファイルから読み込んだ情報のみを表示したい場合
% に用いる. (他のファイルから読み込んだ式番号などは
% そのまま利用できるので便利)
%
%\includeonly{sample-1.tex}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%             Text Start                 %%%%%%%%

\begin{document}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%  表題ページ
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\maketitle


%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%  要旨ページ
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\begin{abstract}
 \input{./abstract.tex} 
\end{abstract}
\clearpage


%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%  目次ページ
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\def\thepage{\roman{page}}  % 目次のページ数はローマ字に
\setcounter{page}{1}
\markboth{目次}{目次}
\Dfile{}
%\Dnoparskip                 % \Dparskip を利用していて行間が空き過ぎる
%                            % 場合に利用する. ただし「本文」の部分で元
%                            % に戻すこと.
\tableofcontents  % 目次
\clearpage
\listoffigures    % 図・表目次
\clearpage


%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%  本文
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%\Dparskip                   % \Dparskip を利用していて上記の「目次」部分で
%                            % 行間を狭めるために \Dnoparskip を利用した
%                            % 場合、ここで元に戻す.
%
\def\thepage{\arabic{page}}  % ページ表記を戻す
\setcounter{page}{1}
\input{sample-1.tex}
\clearpage
\input{sample-2.tex}
\clearpage
\input{sample-3.tex}
\clearpage



%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%  謝辞ページ
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\input{./thanks.tex}
\clearpage


%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%  付録 (Appendices)
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\appendix
%%%%  Counter Output Format
\def\thesection{\Alph{section}}
\def\thesubsection{\Alph{section}-\arabic{subsection}}
\def\thesubsubsection{\Alph{section}-\arabic{subsection}-\arabic{subsubsection}}
\def\theequation{\Alph{section}-\arabic{equation}}
\def\thefigure{\Alph{section}-\arabic{figure}}
\def\thetable{\Alph{section}-\arabic{table}}

\input{./appendix-1.tex}
\clearpage
\input{./appendix-2.tex}
\clearpage


%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%  参考文献ページ
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\input{./reference.tex}
\clearpage


\end{document}
%%%%%%%%              Text End                  %%%%%%%%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%%%%%%%%              Sample                    %%%%%%%%

%%%%%%%%  章, 節, 小節番号の操作                %%%%%%%%
%
% 今いる章, 節を 5-3 のように表すには,
%
%      \arabic{chapter}-\arabic{section}
%
%
% 今いる章, 節, 小節が 5-6-4 で, 5-6-8 と表したい場合
%
%      \arabic{chapter}-\arabic{section}-
%       \addtocounter{subsection}{4}
%        \arabic{subsection}\addtocounter{subsection}{-4}
%
%
% カウンタ操作コマンド一覧
%
%\newcounter{count}%        新たなカウンタ変数の宣言
%\setcounter{count}{6}%     値の代入
%\addtocounter{count}{3}%   足し算
%\addtocounter{count}{-2}%  引き算
%\thecount%                 値を表示 ( TeX の命令 )
%\arabic{count}%            値を表示 ( Latex の命令 )
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

%%%%%%%  脚注 (footnote) にラベルを貼りたい場合  %%%%%%%
%
%% ラベル貼り
%
%\footnote{
% \label{footnote:hw-06-01-直交関数系}
%}
%
%% 呼び出し
%
%脚注\ref{footnote:hw-06-01-直交関数系}
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

%%%%%%%%  数式 (式番号を独立して書きたい場合)   %%%%%%%%
%
%$$
% \DP{p}{z} = \rho g.
% \eqno \textrm{(1-11)}
%$$
%
%\begin{equation}
% \DP{p}{z} = \rho g.
%  \tag{1-11}
%\end{equation}
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

%%%%%%%%  数式 (式, 番号とも, 丸四角で括る場合) %%%%%%%%
%
%\begin{screen}
% \vspace{-4mm}
% \begin{eqnarray}
% \Deqlab{hw-01-09-温度風の各成分}
%  \DP{u}{p} = \frac{R}{fp} \DP{T}{y} ,
% \qquad
%  \DP{v}{p} = - \frac{R}{fp} \DP{T}{x}.
% \end{eqnarray}
%\end{screen}
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

%%%%%%%%  数式 (式のみを四角で括りたい場合)     %%%%%%%%
%
%\begin{eqnarray}
% \Deqlab{action}
% \fbox{$
%  \displaystyle
%  J_i = \oint p_i \Dd q_i
%  $}
%\end{eqnarray}
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%


%%%%%%%%  数式 (5-67a), (5-67b) などと書きたい時 %%%%%%%
%
% subequations 環境を使う. ただし, これを使うには
% プリアンブルで
%
%      \usepackage{amsmath}
%
% とする必要がある.
%
%\begin{subequations}\Deqlab{hw-org-5-67} % 全体のラベル
% %\def\theequation{\arabic{chapter}-\arabic{parentequation}\alph{equation}}
%  % ↑ デフォルトはアルファベットだが, 数等を指定したければここを編集
% %\def\theequation{\ref{eq:hw-org-5-67}\alph{equation}}
%  % ↑ 過去の式を呼びたい時はこうすると良いかも
% \begin{eqnarray}
%  \Deqlab{hw-org-5-67a}
%   F_{m,n+1}^{*} &=& F_{m,n} - \frac{c \Delta t}{2\Delta x}
%   \left(F_{m+1,n} - F_{m-1,n}\right)
%   \\
%  \Deqlab{hw-org-5-67b}
%   F_{m,n+1} &=& F_{m,n} - \frac{c \Delta t}{2\Delta x}
%   \left(F_{m+1,n+1}^{*} - F_{m-1,n+1}^{*} \right)
% \end{eqnarray}
%\end{subequations}
%%\addtocounter{equation}{-1}
%  % ↑ 過去の式を呼んだ時はこうしないとカウンタが余計に1つ進むよ
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%


%%%%  数式 (複数の数式に一つの式番号をつける場合) %%%%%%
%
%\begin{eqnarray}
% \Deqlab{hw-org-5-88}
% \begin{array}{ccccccc}
%  \dfrac{u_{m+1,n} - u_{m-1,n}}{2\Delta t} &+&
%   U\dfrac{u_{m+1,n} - u_{m-1,n}}{2d} &+&
%   \dfrac{\phi_{m+1,n} - \phi_{m-1,n}}{2d} &=& 0 \\
%  \\
%  \Phi \dfrac{u_{m+1,n} - u_{m-1,n}}{2d} &+&
%   \dfrac{\phi_{m+1,n} - \phi_{m-1,n}}{2\Delta t} &+&
%   U\dfrac{\phi_{m+1,n} - \phi_{m-1,n}}{2d} &=& 0
% \end{array}
%\end{eqnarray}
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

%%%  Σ (sum) の下や上に2段の文字を書き込みたい場合  %%%
%
% $$
%  \left|a_{ii}\right| >
%  \sum_{\scriptstyle j=1 \atop \scriptstyle j\neq i}^{n}
%  \left|a_{ij}\right|
% $$
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

%%%%%%%%         参考文献 (本文に書く場合)      %%%%%%%%
%
%{\bfseries 参考文献}
%\vspace{-7mm}
%\begin{description}
% \item	著者名, 2000:
%	書籍名, (章, 節).
%	出版社, 319pp.
%\end{description}
%
%{\bfseries 参考文献}
%\vspace{-7mm}
%\begin{description}
% \item	地球流体電脳倶楽部, 1998: \\
%	AGCM5マニュアル 第2部 離散化. \\
%	\texttt{http://www.gfd-dennou.org/\~{}arch/agcm5/} .
%\end{description}
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%


%%%%%%%%         参考文献 (脚注につける場合)    %%%%%%%%
%
%\footnote{
% 参考文献
% \begin{quote}
%  \begin{description}
%   \item 著者名, 1983:
%	 書籍名, (章, 節).
%	 出版社, 247pp.
%  \end{description}
% \end{quote}
%}
%
%\footnote{
% 参考文献
% \begin{quote}
%  \begin{description}
%   \item Hinkelmann, K., 1959:
%	 Der mechanismus des meteorologischen Larmes.
%	 {\itshape Tellus,} {\bfseries 3,} 285--296.
%  \end{description}
% \end{quote}
%}
%
%\footnote{
% 参考文献
% \begin{quote}
%  \begin{description}
%   \item 倉本 圭, 2000:
%	 北海道大学 理学部 地球科学科 講義
%	       『物理数学I演習, 線形代数の復習2』 \\
%	 \texttt{http://www.ep.sci.hokudai.ac.jp/\~{}pmath1ex/2000/0501/pub/No03.pdf}
%  \end{description}
% \end{quote}
%}
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%


%%%%%%%%    図の貼込み  (本文に張り込む場合)    %%%%%%%%
%
%\begin{figure}[htb]
% \vspace*{10mm}
% \begin{center}
%  \Depsf[][]{./eps/sample.eps}
% \end{center}
% \begin{quote}
%  \caption{
%  {\footnotesize 見出し}
%  }
%  \Dfiglab{hwfig-org-0*-0*}
% \end{quote}
%\end{figure}
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

%%%%%%%%    図の貼込み  (脚注に張り込む場合)    %%%%%%%%
%
%\begin{center}
% \Depsf[][]{./eps/sample.eps}
% \begin{quote}
%  \begin{center}
%   {\scriptsize 見出し}
%  \end{center}
% \end{quote}
%\end{center}
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

%%%%%%%%    表の貼込み  (本文に張り込む場合)    %%%%%%%%
%
%\begin{table}[htb]
% \begin{quote}
%  \caption{
%  {\footnotesize 見出し}
%  }
%  \Dtablab{hwtab-org-??-??}
% \end{quote}
% \vspace{-7.0ex}
% \begin{center}
%  \Depsf[][]{./eps/hwtab-org-??-??.eps}
% \end{center}
%\end{table}
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

%%%%%%%%                リスト                  %%%%%%%%
%
%\begin{Dlist}[項目の幅]
% %\setlength{\itemsep}{-5pt}     % item 間の改行幅
% \item[項目1] 内容1
%
% \item[項目2] 内容2
%\end{Dlist}
%
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

%%%%%%%%   表 (Table) を自作する場合の書式      %%%%%%%%
%
%%% コメント付き %%%
%
%\begin{center}
% %                                     ↓ c:中央, l:左, r: 右寄せ
% \begin{tabular}{@{\vrule width 1pt\ }c|l|r@{\ \vrule width 1pt}}
%  %                   縦線の太さ^^^    ^ ^ ← 中の縦線を消したい場合は
%  %                                           このバー「|」を消す.
%  \noalign{\hrule height 1pt} % ← 太横線
%  項目1 & 項目2 & 項目3\\
%  \noalign{\hrule height 1pt} % ← 太横線
%  センタリング & ひだりよせ & みぎよせ\\
%  \noalign{\hrule height 0.4pt}   % 行を増やす場合は,
%  & & \\         % 細横線 ↑      % この2行を Copy & Paste
%  \noalign{\hrule height 1pt} % ← 太横線
% \end{tabular}
%\end{center}
%
%
%%% コメント無し %%%
%
%\begin{center}
% \begin{tabular}{@{\vrule width 1pt\ }c|l|r@{\ \vrule width 1pt}}
%  \noalign{\hrule height 1pt}
%  項目1 & 項目2 & 項目3\\
%  \noalign{\hrule height 1pt}
%  & & \\
%  \noalign{\hrule height 0.4pt}
%  & & \\
%  \noalign{\hrule height 1pt}
% \end{tabular}
%\end{center}
%
%%% 改行入り %%%
%
%\begin{center}
% \begin{tabular}{c|rl|p{15zw}}
%  変数 & 数値 & [単位] & 備考\\
%  \noalign{\hrule height 1pt}
%  $L$   & $2.500\times 10^{6}$ & [J kg$^{-1}$] 
%   & Appendix 2の「273 K における気化熱」より\\
%  \noalign{\hrule height 0.4pt}
%  $p_s (T_{\infty})$   & $610.78$             & [Pa]
%   & Appendix 2 の「純水での飽和水蒸気圧」の 0$^{\circ}$Cの値より.
%     なお, $T_{\infty} = 273$ Kとした.\\
% \end{tabular}
%\end{center}
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
