   0.0

   0.5

   1.0

                                 k=

                                   2.350

                    C =

                        -0.9872

                        -0.9872 +        i
                                       i
                                 0.0018

     -1.00

     -1.00 -0.95-0.95-0.95-0.95-0.95-0.95-0.95-0.95-0.95